CREATE TABLE PUBLIC.FLW_EV_DATABASECHANGELOGLOCK (
	ID int8 NOT NULL,
	LOCKED bool NOT NULL,
	LOCKGRANTED timestamp,
	LOCKEDBY VARCHAR(255),
	CONSTRAINT FLW_EV_DATABASECHANGELOGLOCK_PK PRIMARY KEY (ID)
);